From 76c439a431431c8445807843595cd7f5f1faebb3 Mon Sep 17 00:00:00 2001
From: Refik Hadzialic
Date: Mon, 23 Jul 2012 18:39:55 +0200
Subject: RRLP Writing

---
 vorlagen/thesis/src/kapitel_A.tex | 7 ++-----
 1 file changed, 2 insertions(+), 5 deletions(-)

(limited to 'vorlagen/thesis/src/kapitel_A.tex')

diff --git a/vorlagen/thesis/src/kapitel_A.tex b/vorlagen/thesis/src/kapitel_A.tex
index 828182e..ff0352b 100644
--- a/vorlagen/thesis/src/kapitel_A.tex
+++ b/vorlagen/thesis/src/kapitel_A.tex
@@ -271,11 +271,8 @@ settings =
 
 
 \todo{CHECK IF THIS IS CORRECT}
-The target user, one wants to locate, has to be inside of a geometric estimated shape.
-This shape can be described using an 
-ellipsoid point with altitude and uncertainty ellipsoid. \todo{CHECK IF THIS IS CORRECT}
-The uncertainty of
-the latitude and longitude correctness can be described
+\label{accuracyUncertainty}
+The uncertainty of the latitude and longitude correctness can be described
 using equation \eqref{eq:unclatlong} \citep{3gppequations}. The uncertainty of
 $r$ is expressed in meters, it defines how accurate is the specified location
 of the BTS. In the configuration file, $K$ is set to 7, which corresponds to
-- 
cgit v1.2.3-55-g7522

