From 7c273a8bcab2da87acb3431448a53e91e360d5eb Mon Sep 17 00:00:00 2001
From: Udo Walter
Date: Sun, 19 Jan 2020 21:18:15 +0000
Subject: [webapp] upgrade/migration from vuetify 1.5 to 2.X still TODO: switch
 from old grid system (v-layout/v-flex) to the new one (v-row/v-col)

---
 webapp/src/components/IpxeBuilderModule.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'webapp/src/components/IpxeBuilderModule.vue')

diff --git a/webapp/src/components/IpxeBuilderModule.vue b/webapp/src/components/IpxeBuilderModule.vue
index e2c38ff..c98912e 100644
--- a/webapp/src/components/IpxeBuilderModule.vue
+++ b/webapp/src/components/IpxeBuilderModule.vue
@@ -14,12 +14,12 @@
     <v-layout>
       <v-flex xl10 offset-xl1 lg12>
         <v-card class="tabbar-card">
-          <v-tabs v-model="tabs" grow :dark="tabsDark" :color="tabsColor" :slider-color="tabsSliderColor" hide-slider>
+          <v-tabs v-model="tabs" grow :dark="tabsDark" :background-color="tabsColor" :slider-color="tabsSliderColor" hide-slider>
             <v-tab><v-icon class="tabbar-tabicon">memory</v-icon>{{ $t('ipxe') }}</v-tab>
           </v-tabs>
         </v-card>
         <v-tabs-items v-model="tabs" style="padding-bottom: 20px">
-          <v-tab-item lazy :transition="false" :reverse-transition="false">
+          <v-tab-item :transition="false" :reverse-transition="false">
             <ipxe-builder-module-config></ipxe-builder-module-config>
           </v-tab-item>
         </v-tabs-items>
-- 
cgit v1.2.3-55-g7522

