From 23ea2985819903fedbb3a9692278201f5da1bb56 Mon Sep 17 00:00:00 2001
From: Christian Hofmaier
Date: Mon, 20 May 2019 02:02:57 +0000
Subject: [permissionmanager] remove console log and tab animation

---
 webapp/src/components/PermissionModule.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'webapp/src/components/PermissionModule.vue')

diff --git a/webapp/src/components/PermissionModule.vue b/webapp/src/components/PermissionModule.vue
index 39d9b02..4a6838e 100644
--- a/webapp/src/components/PermissionModule.vue
+++ b/webapp/src/components/PermissionModule.vue
@@ -28,11 +28,11 @@
           </v-tabs>
         </v-card>
         <v-tabs-items v-model="tabs" style="padding-bottom: 20px">
-          <v-tab-item>
+          <v-tab-item :transition="false" :reverse-transition="false">
             <v-subheader>{{ $t('roles') }}</v-subheader>
             <permission-module-role-list/>
           </v-tab-item>
-          <v-tab-item>
+          <v-tab-item :transition="false" :reverse-transition="false">
             <v-subheader>{{ $t('users') }}</v-subheader>
             <permission-module-user-list/>
           </v-tab-item>
-- 
cgit v1.2.3-55-g7522

