From 7c273a8bcab2da87acb3431448a53e91e360d5eb Mon Sep 17 00:00:00 2001
From: Udo Walter
Date: Sun, 19 Jan 2020 21:18:15 +0000
Subject: [webapp] upgrade/migration from vuetify 1.5 to 2.X still TODO: switch
 from old grid system (v-layout/v-flex) to the new one (v-row/v-col)

---
 webapp/src/components/PermissionModule.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'webapp/src/components/PermissionModule.vue')

diff --git a/webapp/src/components/PermissionModule.vue b/webapp/src/components/PermissionModule.vue
index 4a6838e..c86d8a8 100644
--- a/webapp/src/components/PermissionModule.vue
+++ b/webapp/src/components/PermissionModule.vue
@@ -22,7 +22,7 @@
     <v-layout>
       <v-flex xl10 offset-xl1 lg12>
         <v-card class="elevation-3">
-          <v-tabs v-model="tabs" grow :dark="tabsDark" :color="tabsColor" :slider-color="tabsSliderColor">
+          <v-tabs v-model="tabs" grow :dark="tabsDark" :background-color="tabsColor" :slider-color="tabsSliderColor">
             <v-tab><v-icon class="tabbar-tabicon">verified_user</v-icon>{{ $t('roles') }}</v-tab>
             <v-tab><v-icon class="tabbar-tabicon">people</v-icon>{{ $t('users') }}</v-tab>
           </v-tabs>
-- 
cgit v1.2.3-55-g7522

