From 07e38e498e46090d412b1c58b541222269ad1575 Mon Sep 17 00:00:00 2001
From: Refik Hadzialic
Date: Fri, 28 Oct 2011 15:39:46 +0200
Subject: Report writing

---
 notFinishedCode/Report/test.tex | 12 +++++++++++-
 1 file changed, 11 insertions(+), 1 deletion(-)

(limited to 'notFinishedCode/Report/test.tex')

diff --git a/notFinishedCode/Report/test.tex b/notFinishedCode/Report/test.tex
index 1233416..426b642 100644
--- a/notFinishedCode/Report/test.tex
+++ b/notFinishedCode/Report/test.tex
@@ -75,6 +75,16 @@ escapeinside={\%}{)}          % if you want to add a comment within your code
 \newcommand{\titleOfProject}{Software for self-testing of the Telecommunication network of University of Freiburg}
 
 
+%Information
+\pdfinfo{
+   /Author (Refik Hadzialic)
+   /Title  (Software for self-testing of the Telecommunication network of University of Freiburg)
+   /CreationDate (D:20111105100000)
+   /Subject (PDFLaTeX)
+   /Keywords (telecommunication;network;networking;linux;ubuntu;university;freiburg;python;tcp/ip;security;gsm;sip)
+}
+
+
 
 %begin of the document
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%
@@ -224,7 +234,7 @@ The software engineering design concepts were achieved following way:
 
 \par The basic principle how the test software works can be seen in figure 5. The test software is
 started either manually from the terminal or using the web site. When the test software 
-is started manually it is not database dependent and thefore could be used if the 
+is started manually it is database dependent as well and thefore could not be used if the 
 database is being maintained or not working. If it is started from the web site it 
 connects to the database to get its tasks which have to be performed. After receiving 
 the tasks it makes a simple network test by pinging all the servers. The ping results
-- 
cgit v1.2.3-55-g7522

