From 991e653343e1cbfca64bf349d95db5ff996323db Mon Sep 17 00:00:00 2001
From: Refik Hadzialic
Date: Thu, 27 Oct 2011 17:09:34 +0200
Subject: Report writing

---
 notFinishedCode/Report/test.tex | 4 +++-
 1 file changed, 3 insertions(+), 1 deletion(-)

(limited to 'notFinishedCode/Report/test.tex')

diff --git a/notFinishedCode/Report/test.tex b/notFinishedCode/Report/test.tex
index b257db2..cada828 100644
--- a/notFinishedCode/Report/test.tex
+++ b/notFinishedCode/Report/test.tex
@@ -1016,7 +1016,9 @@ tested (SIP and University telephone network). It will try to identify if there
 problems on the Asterisk server and our University telephone network, including incoming and
 outgoing calls from the SIP side. 
 \subsubsection{GSM test}
-
+In the \emph{GSM} test both GSM networks get tested, the local and the external GSM netwrok. 
+We test the nanoBTS boxes (i.e. BeagleBoards) as well. Using this test, both incoming 
+and outgoing calls are performed, we can detect possible errors on the OpenBSC and the nanoBTS.
 \subsection{Using the software}
 \subsection{Error description}
 \newpage
-- 
cgit v1.2.3-55-g7522

