From 9e83d2322b125eb5e4d7eca56aee45026b764b56 Mon Sep 17 00:00:00 2001
From: Refik Hadzialic
Date: Thu, 27 Oct 2011 17:00:10 +0200
Subject: Report writing

---
 notFinishedCode/Report/test.tex | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'notFinishedCode/Report/test.tex')

diff --git a/notFinishedCode/Report/test.tex b/notFinishedCode/Report/test.tex
index b466aee..b257db2 100644
--- a/notFinishedCode/Report/test.tex
+++ b/notFinishedCode/Report/test.tex
@@ -1015,6 +1015,8 @@ The \emph{SIP} test option will perform test in such a way that all the SIP subs
 tested (SIP and University telephone network). It will try to identify if there are any
 problems on the Asterisk server and our University telephone network, including incoming and
 outgoing calls from the SIP side. 
+\subsubsection{GSM test}
+
 \subsection{Using the software}
 \subsection{Error description}
 \newpage
-- 
cgit v1.2.3-55-g7522

