From b2bda1b7b95d8691865bf295f21c149a49caa55a Mon Sep 17 00:00:00 2001
From: Refik Hadzialic
Date: Wed, 5 Oct 2011 12:31:00 +0200
Subject: Working on report!

---
 notFinishedCode/Report/test.tex | 23 +++++++++++++++++++++--
 1 file changed, 21 insertions(+), 2 deletions(-)

(limited to 'notFinishedCode/Report/test.tex')

diff --git a/notFinishedCode/Report/test.tex b/notFinishedCode/Report/test.tex
index 47bc0fd..7bfd079 100644
--- a/notFinishedCode/Report/test.tex
+++ b/notFinishedCode/Report/test.tex
@@ -110,7 +110,26 @@ Gradually we implemented a bit-by-bit of the final software. Every single step w
 \section{Design}
 \newpage
 \section{Protocol}
-\newpage
+
+\begin{figure}[hb!]
+  \centering
+  \includegraphics[width=130mm]{protocolCommunicationHandler.png}
+  \caption[]{Flowchart of the protocol, on the handler side}
+\end{figure}
+
+\begin{figure}[hb!]
+  \centering
+  \includegraphics[width=130mm]{protocolCommunicationcControllerReceiver.png}
+  \caption[]{Flowchart of the protocol, on the controller side for the caller}
+\end{figure}
+
+\begin{figure}[hb!]
+  \centering
+  \includegraphics[width=130mm]{protocolCommunicationcControllerCaller.png}
+  \caption[]{Flowchart of the protocol, on the controller side for the receiver}
+\end{figure}
+
+%\newpage
 \section{Encryption of data}
 \begin{lstlisting}
 import subprocess
@@ -137,7 +156,7 @@ b
 \newpage
 \section{Web page}
 
-\begin{figure}
+\begin{figure}[hb!]
   \centering
   \includegraphics[width=100mm]{resultsImage.png}
   \caption[]{Result image showing working, defected and not tested subsystems}
-- 
cgit v1.2.3-55-g7522

