From b6cac4a899be762fd2886062e777edac7b18816f Mon Sep 17 00:00:00 2001
From: Refik Hadzialic
Date: Fri, 28 Oct 2011 16:24:14 +0200
Subject: Report writing, error part

---
 notFinishedCode/Report/test.tex | 11 ++++++-----
 1 file changed, 6 insertions(+), 5 deletions(-)

(limited to 'notFinishedCode/Report/test.tex')

diff --git a/notFinishedCode/Report/test.tex b/notFinishedCode/Report/test.tex
index 1220219..60bf69a 100644
--- a/notFinishedCode/Report/test.tex
+++ b/notFinishedCode/Report/test.tex
@@ -1100,15 +1100,16 @@ The \emph{Manual} test as the name itself says, is the test where you can manual
 what kind of tests you want to be performed. 
 \subsection{Using the software}
 \subsection{Error description}
+In the 
 \begin{lstlisting}
 			200	Call was OK
-			604	General Handler Error: Destination handler no respond timeout
-			998	General Handler Error: Could not connect Destination handler
-			605	General Handler Error: caller handler no respond timeout
-			999	General Handler Error: Could not connect to Caller handler
+			604	General Handler Error: Destination handler did not respond. Timeout
+			998	General Handler Error: Could not connect to the destination handler!
+			605	General Handler Error: Caller handler did not respond. Timeout
+			999	General Handler Error: Could not connect to the caller handler!
 			486	Call Failed
 			500	Server Internal Error
-			333	No connection to Database
+			333	Could not establish a connection to the database!
 			100	Missing account detail
 			402	Payment Required (Eplus Card)
 \end{lstlisting}
-- 
cgit v1.2.3-55-g7522

