From b8cb41be2ca502948fa0f48c4a3574a5939d0c82 Mon Sep 17 00:00:00 2001
From: Refik Hadzialic
Date: Thu, 27 Oct 2011 17:17:10 +0200
Subject: Report writing, I am gonna die!

---
 notFinishedCode/Report/test.tex | 7 +++++++
 1 file changed, 7 insertions(+)

(limited to 'notFinishedCode/Report/test.tex')

diff --git a/notFinishedCode/Report/test.tex b/notFinishedCode/Report/test.tex
index cada828..1cc65d7 100644
--- a/notFinishedCode/Report/test.tex
+++ b/notFinishedCode/Report/test.tex
@@ -1019,6 +1019,13 @@ outgoing calls from the SIP side.
 In the \emph{GSM} test both GSM networks get tested, the local and the external GSM netwrok. 
 We test the nanoBTS boxes (i.e. BeagleBoards) as well. Using this test, both incoming 
 and outgoing calls are performed, we can detect possible errors on the OpenBSC and the nanoBTS.
+\subsubsection{All test}
+The \emph{All} test selects all the given tests and executes them step-by-step. It is the test
+that takes the greatest amount of time. While the test are performed, results are 
+immediatelly printed in the terminal window or on the web site.
+\subsubsection{Manual test}
+The \emph{Manual} test as the name itself says, is the test where you can manually select
+what kind of tests you want be performed. 
 \subsection{Using the software}
 \subsection{Error description}
 \newpage
-- 
cgit v1.2.3-55-g7522

