From dd7fbbb07c3a3d26a4838f87d7bafba7d89ae08b Mon Sep 17 00:00:00 2001
From: Refik Hadzialic
Date: Fri, 28 Oct 2011 17:33:19 +0200
Subject: Report writing

---
 notFinishedCode/Report/test.tex | 40 +++++++++++++++++++++++++---------------
 1 file changed, 25 insertions(+), 15 deletions(-)

(limited to 'notFinishedCode/Report/test.tex')

diff --git a/notFinishedCode/Report/test.tex b/notFinishedCode/Report/test.tex
index 60bf69a..bec5af2 100644
--- a/notFinishedCode/Report/test.tex
+++ b/notFinishedCode/Report/test.tex
@@ -402,7 +402,7 @@ Since one of the project goals was to reduce the costs as much as it was possibl
 Source Community.
 \begin{figure}[ht!]
   \centering
-  \includegraphics[width=130mm]{bb.jpg}
+  \includegraphics[width=60mm]{bb.jpg}
   \caption[]{BeagleBoard, a Linux-on-chip board where our controller software runs the GSM device }
 \end{figure}
 It has been equipped with a minimum set of features to allow the 
@@ -1099,20 +1099,30 @@ immediatelly printed in the terminal window or on the web site.
 The \emph{Manual} test as the name itself says, is the test where you can manually select
 what kind of tests you want to be performed. 
 \subsection{Using the software}
-\subsection{Error description}
-In the 
-\begin{lstlisting}
-			200	Call was OK
-			604	General Handler Error: Destination handler did not respond. Timeout
-			998	General Handler Error: Could not connect to the destination handler!
-			605	General Handler Error: Caller handler did not respond. Timeout
-			999	General Handler Error: Could not connect to the caller handler!
-			486	Call Failed
-			500	Server Internal Error
-			333	Could not establish a connection to the database!
-			100	Missing account detail
-			402	Payment Required (Eplus Card)
-\end{lstlisting}
+\subsection{Result and error descriptions}
+In the following table you can see the messages returned by the test software! \\
+
+\begin{table}[h]\footnotesize
+\begin{center}
+%\caption[]{Table of error descriptions}
+  \begin{tabular}{| l | c || l | }
+    \hline
+    Number & Error code & Error description \\ \hline
+    1 & 200 & Call was OK \\ \hline
+    2 & 604 & General Handler Error: Destination handler did not respond. Timeout \\ \hline
+    3 & 998 & General Handler Error: Could not connect to the destination handler! \\ \hline
+    4 & 605 & General Handler Error: Caller handler did not respond. Timeout \\ \hline
+    5 & 999 & General Handler Error: Could not connect to the caller handler! \\ \hline
+    6 & 486 & Call Failed \\ \hline
+    7 & 333 & Could not establish a connection to the database! \\ \hline
+    8 & 100 & Missing account detail \\ \hline
+    9 & 402 & Payment Required (Eplus Card) \\ \hline
+
+    \hline
+    
+  \end{tabular}
+\end{center}
+\end{table}
 \newpage
 \section{Conclusion}
 As a result of our successfully finished team project, we had felt how it is to work 
-- 
cgit v1.2.3-55-g7522

