From 4c0d3ae3a42871bfd78ea3c93d9bd72ca8939b50 Mon Sep 17 00:00:00 2001
From: Björn Geiger
Date: Sat, 25 Jun 2011 17:17:45 +0200
Subject: Setup korrigiert

---
 setup/poolctrl.sql | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'setup/poolctrl.sql')

diff --git a/setup/poolctrl.sql b/setup/poolctrl.sql
index ba93efe..f565baf 100644
--- a/setup/poolctrl.sql
+++ b/setup/poolctrl.sql
@@ -1,5 +1,5 @@
-CREATE DATABASE `poolctrl` DEFAULT CHARACTER SET utf8 COLLATE utf8_unicode_ci;
-USE poolctrl;
+CREATE DATABASE `##poolctrl##` DEFAULT CHARACTER SET utf8 COLLATE utf8_unicode_ci;
+USE ##poolctrl##;
 SET SQL_MODE="NO_AUTO_VALUE_ON_ZERO";
 
 -- PoolCtrl Tabellen
-- 
cgit v1.2.3-55-g7522

