From 330ab830fd8915743348560fe6b2094206dd907d Mon Sep 17 00:00:00 2001
From: Björn Geiger
Date: Fri, 19 Aug 2011 10:56:41 +0200
Subject: verschiedene Gearman Einstellungen in die application.ini verschoben

---
 setup/poolctrl_data.sql | 10 +++++-----
 1 file changed, 5 insertions(+), 5 deletions(-)

(limited to 'setup/poolctrl_data.sql')

diff --git a/setup/poolctrl_data.sql b/setup/poolctrl_data.sql
index 87ed4ab..365a3a5 100644
--- a/setup/poolctrl_data.sql
+++ b/setup/poolctrl_data.sql
@@ -96,13 +96,13 @@ INSERT INTO `poolctrl_event` (`eventID`, `title`, `start`, `end`, `category`, `p
 (2, 'Systeme II', '2011-06-24 14:10:00', '2011-06-24 16:00:00', '1', 1, 1, 1, 'Systeme II Vorlesung', 1, 1),
 (3, 'Systeme III', '2011-06-24 16:10:00', '2011-06-24 18:00:00', '1', 1, 1, 1, 'Systeme III Vorlesung', 1, 1);
 
+-- Adding reporttypes
+INSERT INTO `poolctrl_reporttype` (`reporttypeID`, `title`) VALUES
+(1, 'Boot'),
+(2, 'Shutdown');
+
 -- Adding eventreports
 INSERT INTO `poolctrl_eventreport` (`reportID`, `report`, `type`, `eventID`) VALUES
 (1, DEFAULT, 1, 1),
 (2, DEFAULT, 1, 2),
 (3, 'wake-on-lan failed', 1, 3);
-
--- Adding reporttypes
-INSERT INTO `poolctrl_reporttype` (`reporttypeID`, `title`) VALUES
-(1, 'Boot'),
-(2, 'Shutdown');
-- 
cgit v1.2.3-55-g7522

